Front Cover

All images need to be at a minimum resolution of 300dpi
If any images are required to print to the edge of the page then 3mm bleed will need to be added
Keep any essential elements within 3mm of the page edge

ADDITIONAL IMAGE(S)

2021 YEAR PLANNER

YOUR IMAGE
(JANUARY)

YOUR IMAGE
(FEBRUARY)

YOUR IMAGE
(MARCH)

YOUR IMAGE
(APRIL)

YOUR IMAGE
(MAY)

YOUR IMAGE
(JUNE)

YOUR IMAGE
(JULY)

YOUR IMAGE
(AUGUST)

YOUR IMAGE
(SEPTEMBER)

YOUR IMAGE
(OCTOBER)

YOUR IMAGE
(NOVEMBER)

YOUR IMAGE
(DECEMBER)

Back Cover